[role="xpack"]
[[dev-settings-kb]]
=== Development tools settings in Kibana
++++
<titleabbrev>Development tools settings</titleabbrev>
++++

You do not need to configure any settings to use the development tools in {kib}.
They are enabled by default.

[float]
[[grok-settings]]
==== Grok Debugger settings

`xpack.grokdebugger.enabled`::
Set to `true` (default) to enable the <<xpack-grokdebugger,Grok Debugger>>.

[float]
[[profiler-settings]]
==== {searchprofiler} Settings

`xpack.searchprofiler.enabled`::
Set to `true` (default) to enable the <<xpack-profiler,{searchprofiler}>>.
