[role="xpack"]
[[logs-ui-settings-kb]]
=== Logs app settings in Kibana
++++
<titleabbrev>Logs settings</titleabbrev>
++++

You do not need to configure any settings to use the Logs app in {kib}. It is enabled by default.

[float]
[[general-logs-ui-settings-kb]]
==== General Logs settings

include::general-infra-logs-ui-settings.asciidoc[]
