[role="xpack"]
[[canvas-present-workpad]]
=== Present your workpad

When you are ready to present your workpad, use and enable the presentation options.

[float]
[[view-fullscreen-mode]]
==== View your workpad in fullscreen mode

Click the *Enter fullscreen mode* icon.

[role="screenshot"]
image::images/canvas-fullscreen.png[Fullscreen mode]

[float]
[[enable-autoplay]]
==== Enable autoplay 

Automatically cycle through your workpads pages in fullscreen mode.

. Click the *Control settings* icon.

. Under *Change cycling interval*, select the interval you want to use.
+
[role="screenshot"]
image::images/canvas-refresh-interval.png[Element data refresh interval]
