[role="xpack"]
[[canvas-present-workpad]]
=== Present your workpad

When you are ready to present your workpad, use and enable the presentation options.

. Configure the autoplay options.

.. From the workpad menu, click *View > Autoplay settings*.

.. Under *Change cycling interval*, select the interval you want to use, or *Set a custom interval*.
+
[role="screenshot"]
image::images/canvas-autoplay-interval.png[Element autoplay interval]

. To enable autoplay, click *View > Turn autoplay on*.

. To start your presentation, click *View > Enter fullscreen mode*.
+
[role="screenshot"]
image::images/canvas-fullscreen.png[Fullscreen mode]

. When you are ready to exit fullscreen mode, press the Esc (Escape) key.
