==== Run {kib} with SysV `init`

Use the `update-rc.d` command to configure Kibana to start automatically
when the system boots up:

[source,sh]
--------------------------------------------------
sudo update-rc.d kibana defaults 95 10
--------------------------------------------------

You can start and stop Kibana using the `service` command:

[source,sh]
--------------------------------------------
sudo -i service kibana start
sudo -i service kibana stop
--------------------------------------------

If Kibana fails to start for any reason, it will print the reason for
failure to `STDOUT`. Log files can be found in `/var/log/kibana/`.
