=== Automatically Refreshing the Page
You can configure a refresh interval to automatically refresh the page with the latest index data. This periodically
resubmits the search query.

When a refresh interval is set, it is displayed to the left of the Time Filter in the menu bar.

To set the refresh interval:

. Click the *Time Filter* image:images/TimeFilter.jpg[Time Filter].
. Click the *Refresh Interval* tab.
. Choose a refresh interval from the list.

To automatically refresh the data, click the image:images/autorefresh.png[] *Auto-refresh* button when the time picker
is open and select an autorefresh interval:

image::images/autorefresh-intervals.png[]

When auto-refresh is enabled, Kibana's top bar displays a pause button and the auto-refresh interval:
image:images/autorefresh-pause.png[]. Click the *Pause* button to pause auto-refresh.
