[role="xpack"]
[[dev-settings-kb]]
=== Development tools settings in {kib}
++++
<titleabbrev>Development tools settings</titleabbrev>
++++

You do not need to configure any settings to use the development tools in {kib}.
They are enabled by default.

[float]
[[grok-settings]]
==== Grok Debugger settings

[cols="2*<"]
|===
| `xpack.grokdebugger.enabled` {ess-icon}
  | Set to `true` to enable the <<xpack-grokdebugger,Grok Debugger>>. Defaults to `true`.

|===

[float]
[[profiler-settings]]
==== {searchprofiler} settings

[cols="2*<"]
|===
| `xpack.searchprofiler.enabled`
  | Set to `true` to enable the <<xpack-profiler,{searchprofiler}>>. Defaults to `true`.

|===
