[role="xpack"]
[[ingest-manager-settings-kb]]
=== {ingest-manager} settings in {kib}
++++
<titleabbrev>{ingest-manager} settings</titleabbrev>
++++

experimental[]

You can configure `xpack.ingestManager` settings in your `kibana.yml`. 
By default, {ingest-manager} is enabled. To use {fleet}, you also need to configure {kib} and {es} hosts.

See the {ingest-guide}/index.html[Ingest Management] docs for more information.

[[general-ingest-manager-settings-kb]]
==== General {ingest-manager} settings

[cols="2*<"]
|===
| `xpack.ingestManager.enabled` {ess-icon}
  | Set to `true` (default) to enable {ingest-manager}. 
| `xpack.ingestManager.fleet.enabled` {ess-icon}
  | Set to `true` (default) to enable {fleet}. 
|===

[[ingest-manager-data-visualizer-settings]]

==== {package-manager} settings

[cols="2*<"]
|===
| `xpack.ingestManager.registryUrl`
  | The address to use to reach {package-manager} registry.
|===

==== {fleet} settings

[cols="2*<"]
|===
| `xpack.ingestManager.fleet.kibana.host`
  | The hostname used by {agent} for accessing {kib}.
| `xpack.ingestManager.fleet.elasticsearch.host`
  | The hostname used by {agent} for accessing {es}.
| `xpack.ingestManager.fleet.tlsCheckDisabled`
  | Set to `true` to allow {fleet} to run on a {kib} instance without TLS enabled.
|===

[NOTE]
====
In {ecloud}, {fleet} flags are already configured.
====
