[[configuring-console]]
=== Configuring Console

You can add the following options in the `config/kibana.yml` file:

`console.enabled`:: *Default: true* Set to false to disable Console. Toggling this will cause the server to regenerate assets on the next startup, which may cause a delay before pages start being served.
